﻿<template>
  <div class="medical-document">
    <!-- 标题区域 -->
    <div class="doc-header">
      <h1 class="doc-title">
        {{ hospitalName }} 住院患者入院沟通记录单
      </h1>
      <div class="doc-subtitle">
        住院号: {{ formData.hospitalNo || '待填写' }}
      </div>
    </div>

    <!-- 内容区域 -->
    <el-form
      ref="formRef"
      :model="formData"
      :rules="rules"
      label-width="100px"
      label-align="left"
      class="doc-content"
    >
      <!-- 患者基础信息 -->
      <section class="doc-section">
        <h2 class="section-title">
          一、患者基础信息
        </h2>
        <div class="adaptive-grid">
          <el-form-item
            label="姓名"
            prop="patientName"
            class="grid-item required"
          >
            <el-input
              v-model="formData.patientName"
              placeholder="请输入患者姓名"
              clearable
            />
          </el-form-item>
          <el-form-item
            label="性别"
            prop="gender"
            class="grid-item required"
          >
            <el-select
              v-model="formData.gender"
              placeholder="请选择性别"
            >
              <el-option
                label="男"
                value="男"
              />
              <el-option
                label="女"
                value="女"
              />
            </el-select>
          </el-form-item>

          <el-form-item
            label="年龄"
            prop="age"
            class="grid-item required"
          >
            <div class="input-with-unit">
              <el-input
                v-model.number="formData.age"
                placeholder="请输入年龄"
                clearable
              />
              <span class="unit">岁</span>
            </div>
          </el-form-item>

          <el-form-item
            label="科室/病区"
            prop="department"
            class="grid-item required"
          >
            <el-input
              v-model="formData.department"
              placeholder="如：内科疗区"
              clearable
            />
          </el-form-item>

          <el-form-item
            label="病房/床号"
            prop="bedNo"
            class="grid-item required"
          >
            <el-input
              v-model="formData.bedNo"
              placeholder="如：307-12"
              clearable
            />
          </el-form-item>

          <el-form-item
            label="入院日期"
            prop="admissionDate"
            class="grid-item required"
          >
            <el-date-picker
              v-model="formData.admissionDate"
              type="date"
              placeholder="选择入院日期"
              value-format="YYYY-MM-DD"
            />
          </el-form-item>
        </div>
      </section>

      <!-- 医疗团队信息 -->
      <section class="doc-section">
        <h2 class="section-title">
          二、医疗团队信息
        </h2>
        <div class="adaptive-grid">
          <el-form-item
            label="经治医师"
            prop="treatingDoctor"
            class="grid-item required"
          >
            <el-input
              v-model="formData.treatingDoctor"
              placeholder="请输入医师姓名"
              clearable
            />
          </el-form-item>

          <el-form-item
            label="主治医师"
            prop="attendingDoctor"
            class="grid-item required"
          >
            <el-input
              v-model="formData.attendingDoctor"
              placeholder="请输入医师姓名"
              clearable
            />
          </el-form-item>

          <el-form-item
            label="科主任"
            prop="departmentHead"
            class="grid-item required"
          >
            <el-input
              v-model="formData.departmentHead"
              placeholder="请输入主任姓名"
              clearable
            />
          </el-form-item>
        </div>
      </section>

      <!-- 病情与诊断 -->
      <section class="doc-section">
        <h2 class="section-title">
          三、病情与诊断
        </h2>
        <el-form-item
          label="病情状况"
          prop="condition"
          class="full-width-item required"
        >
          <el-input
            v-model="formData.condition"
            type="textarea"
            placeholder="详细描述患者病情状况"
            autosize
            maxlength="1000"
            show-word-limit
          />
        </el-form-item>
        <div class="diagnosis-container">
          <el-form-item
            label="中医诊断"
            prop="tcmDiagnosis"
            class="diagnosis-item"
          >
            <el-input
              v-model="formData.tcmDiagnosis"
              type="textarea"
              placeholder="如：胸痹心痛（气阴两虚证）"
              autosize
              maxlength="500"
              show-word-limit
            />
          </el-form-item>
          <el-form-item
            label="西医诊断"
            prop="westernDiagnosis"
            class="diagnosis-item"
          >
            <el-input
              v-model="formData.westernDiagnosis"
              type="textarea"
              placeholder="如：1.冠状动脉粥样硬化性心脏病..."
              autosize
              maxlength="800"
              show-word-limit
            />
          </el-form-item>
        </div>
      </section>

      <!-- 治疗与检查计划 -->
      <section class="doc-section">
        <h2 class="section-title">
          四、治疗与检查计划
        </h2>
        <el-form-item
          label="治疗方案"
          prop="treatmentPlan"
          class="full-width-item required"
        >
          <el-input
            v-model="formData.treatmentPlan"
            type="textarea"
            placeholder="详细描述治疗方案"
            autosize
            maxlength="1000"
            show-word-limit
          />
        </el-form-item>

        <el-form-item
          label="进一步检查项目"
          prop="examinationItems"
          class="full-width-item required"
        >
          <el-input
            v-model="formData.examinationItems"
            type="textarea"
            placeholder="列出需要进行的检查项目"
            autosize
            maxlength="1000"
            show-word-limit
          />
        </el-form-item>
      </section>

      <!-- 风险告知 -->
      <section class="doc-section">
        <h2 class="section-title">
          五、风险告知
        </h2>
        <el-form-item
          label="告知内容"
          prop="riskNotification"
          class="full-width-item required"
        >
          <el-input
            v-model="formData.riskNotification"
            type="textarea"
            placeholder="告知患者可能存在的风险"
            autosize
            maxlength="800"
            show-word-limit
          />
        </el-form-item>
      </section>

      <!-- 签署区域（优化后：三列自适应+细节样式） -->
      <section class="doc-section">
        <h2 class="section-title">
          六、签署确认
        </h2>
        <div
          class="adaptive-grid signature-area"
          style="grid-template-columns: repeat(auto-fit, minmax(240px, 1fr))"
        >
          <el-form-item
            label="患者或家属签字"
            prop="patientSignature"
            class="grid-item required"
          >
            <el-input
              v-model="formData.patientSignature"
              placeholder="请签字"
              clearable
            />
            <div class="signature-tip">
              请填写患者或家属签字
            </div>
          </el-form-item>

          <el-form-item
            label="与患者关系"
            prop="relationship"
            class="grid-item"
          >
            <el-input
              v-model="formData.relationship"
              placeholder="如：本人、配偶、子女"
              clearable
            />
          </el-form-item>

          <el-form-item
            label="签字日期"
            prop="signatureDate"
            class="grid-item required"
          >
            <el-date-picker
              v-model="formData.signatureDate"
              type="date"
              placeholder="选择签字日期"
              value-format="YYYY-MM-DD"
              style="width: 100%"
            />
          </el-form-item>

          <el-form-item
            label="沟通医师签字"
            prop="doctorSignature"
            class="grid-item required"
          >
            <el-input
              v-model="formData.doctorSignature"
              placeholder="请签字"
              clearable
            />
            <div class="signature-tip">
              请填写沟通医师签字
            </div>
          </el-form-item>
          <el-form-item
            label="沟通日期"
            prop="communicationDate"
            class="grid-item required"
          >
            <el-date-picker
              v-model="formData.communicationDate"
              type="datetime"
              placeholder="选择沟通日期时间"
              value-format="YYYY-MM-DD HH:mm"
              style="width: 100%"
            />
          </el-form-item>
        </div>
      </section>
    </el-form>

    <!-- 操作按钮 -->
    <div class="btn-group">
      <el-button
        type="primary"
        @click="submit"
      >
        保存记录
      </el-button>
      <el-button
        type="success"
        @click="handlePrint"
      >
        打印记录
      </el-button>
      <el-button
        type="warning"
        @click="handleReset"
      >
        重置表单
      </el-button>
    </div>
  </div>
</template>

<script setup>
import {onMounted, reactive, ref} from 'vue';
import useUserStore from '@/store/modules/user';
// 迁移到 hiprint
import { previewPrint } from '@/utils/printUtils.js';

const userStore = useUserStore();
// 医院名称
const hospitalName = userStore.hospitalName;
defineOptions({
  name: 'InHospitalCommunicate',
});
// Props与事件
const props = defineProps({
  patientInfo: {
    type: Object,
    required: true,
  },
});
// 生命周期
onMounted(() => {
  if (!formData.patientName) {
    formData.patientName = patient?.patientName || '';
  }
  if (!formData.gender) {
    formData.gender = patient?.genderEnum_enumText || '';
  }
  if (!formData.age) {
    formData.age = patient?.age || '';
  }
  if (!formData.hospitalNo) {
    formData.hospitalNo = patient?.busNo || '';
  }
  if (!formData.department) {
    formData.department = patient?.inHospitalOrgName || '';
  }
  if (!formData.bedNo) {
    formData.bedNo = (patient?.houseName && patient?.bedName ? patient.houseName + '-' + patient.bedName : '');
  }
});
const patient = props.patientInfo;
console.log('patient1111=======>', JSON.stringify(patient));
// 表单引用
const formRef = ref(null);

// 表单数据
const formData = reactive({
  // 基础信息
  hospitalNo: '',
  patientName: '',
  gender: '',
  age: '',
  department: '',
  bedNo: '',
  admissionDate: '',
  // 医疗团队
  treatingDoctor: '',
  attendingDoctor: '',
  departmentHead: '',
  // 病情诊断
  condition: '',
  tcmDiagnosis: '',
  westernDiagnosis: '',

  // 治疗检查
  treatmentPlan: '',
  examinationItems: '',

  // 风险告知
  riskNotification: '',

  // 签署信息
  patientSignature: '',
  relationship: '',
  signatureDate: '',
  doctorSignature: '',
  communicationDate: '',
});

// 表单验证规则
const rules = reactive({
  hospitalNo: [{ required: true, message: '请填写住院号', trigger: ['blur', 'submit'] }],
  patientName: [{ required: true, message: '请填写患者姓名', trigger: ['blur', 'submit'] }],
  gender: [{ required: true, message: '请选择性别', trigger: ['change', 'submit'] }],
  age: [
    { required: true, message: '请填写年龄', trigger: ['blur', 'submit'] },
    { type: 'number', min: 0, max: 150, message: '年龄需在0-150之间', trigger: ['blur', 'submit'] },
  ],
  department: [{ required: true, message: '请填写科室/病区', trigger: ['blur', 'submit'] }],
  bedNo: [{ required: true, message: '请填写病房/床号', trigger: ['blur', 'submit'] }],
  admissionDate: [{ required: true, message: '请选择入院日期', trigger: ['change', 'submit'] }],
  treatingDoctor: [{ required: true, message: '请填写经治医师', trigger: ['blur', 'submit'] }],
  attendingDoctor: [{ required: true, message: '请填写主治医师', trigger: ['blur', 'submit'] }],
  departmentHead: [{ required: true, message: '请填写科主任', trigger: ['blur', 'submit'] }],
  condition: [{ required: true, message: '请描述病情状况', trigger: ['blur', 'submit'] }],
  treatmentPlan: [{ required: true, message: '请填写治疗方案', trigger: ['blur', 'submit'] }],
  examinationItems: [{ required: true, message: '请填写检查项目', trigger: ['blur', 'submit'] }],
  riskNotification: [
    { required: true, message: '请填写风险告知内容', trigger: ['blur', 'submit'] },
  ],
  patientSignature: [
    { required: true, message: '请填写患者或家属签字', trigger: ['blur', 'submit'] },
  ],
  signatureDate: [{ required: true, message: '请选择签字日期', trigger: ['change', 'submit'] }],
  doctorSignature: [{ required: true, message: '请填写医师签字', trigger: ['blur', 'submit'] }],
  communicationDate: [{ required: true, message: '请选择沟通日期', trigger: ['change', 'submit'] }],
});

// 生命周期
onMounted(() => {
  // 初始化日期为当前日期
  const today = new Date();
  formData.admissionDate = formatDate(today);
  formData.signatureDate = formatDate(today);
  formData.communicationDate = formatDateTime(today);
});

const emits = defineEmits(['submitOk']);

// 提交表单
const submit = () => {
  formRef.value.validate((valid) => {
    if (valid) {
      ElMessage.success('记录保存成功');
      console.log('表单数据:', formData);
      emits('submitOk', formData);
    }
  });
};

// 表单数据赋值
const setFormData = (data) => {
  if (data) {
    Object.assign(formData, data);
  }
};

// 打印功能 - 使用 hiprint
const handlePrint = () => {
  formRef.value.validate((valid) => {
    if (valid) {
      const printDom = document.querySelector('.form-container');
      if (printDom) {
        previewPrint(printDom);
      } else {
        window.print();
      }
    } else {
      ElMessageBox.warning('请先完善表单信息再打印');
    }
  });
};

// 重置表单
const handleReset = () => {
  ElMessageBox.confirm('确定要重置表单吗？所有已填写内容将被清空', '确认重置', {
    confirmButtonText: '确定',
    cancelButtonText: '取消',
    type: 'warning',
  }).then(() => {
    formRef.value.resetFields();
    const today = new Date();
    formData.admissionDate = formatDate(today);
    formData.signatureDate = formatDate(today);
    formData.communicationDate = formatDateTime(today);
    ElMessage.success('表单已重置');
  });
};

// 日期格式化工具
const formatDate = (date) => {
  const year = date.getFullYear();
  const month = String(date.getMonth() + 1).padStart(2, '0');
  const day = String(date.getDate()).padStart(2, '0');
  return `${year}-${month}-${day}`;
};

const formatDateTime = (date) => {
  const year = date.getFullYear();
  const month = String(date.getMonth() + 1).padStart(2, '0');
  const day = String(date.getDate()).padStart(2, '0');
  const hour = String(date.getHours()).padStart(2, '0');
  const minute = String(date.getMinutes()).padStart(2, '0');
  return `${year}-${month}-${day} ${hour}:${minute}`;
};

defineExpose({ submit, setFormData });
</script>

<style scoped>
.medical-document {
  max-width: 1200px;
  margin: 20px auto;
  padding: 30px;
  background: #fff;
  box-shadow: 0 0 10px rgba(0, 0, 0, 0.1);
  font-family: 'SimSun', '宋体', serif;
}

/* 标题样式 */
.doc-header {
  text-align: center;
  margin-bottom: 30px;
}

.doc-title {
  font-size: 22px;
  margin: 0 0 10px;
  font-weight: bold;
}

.doc-subtitle {
  font-size: 16px;
  color: #666;
  margin-bottom: 20px;
  padding-bottom: 10px;
  border-bottom: 2px solid #333;
}

/* 内容区域 */
.doc-content {
  width: 100%;
}

.doc-section {
  margin-bottom: 25px;
  padding-bottom: 15px;
  border-bottom: 1px dashed #ccc;
}

.section-title {
  font-size: 18px;
  margin: 0 0 15px;
  color: #333;
  font-weight: bold;
}

/* 自适应网格布局 */
.adaptive-grid {
  display: grid;
  grid-template-columns: repeat(auto-fit, minmax(250px, 1fr));
  gap: 15px 20px;
  margin-bottom: 15px;
}

.grid-item {
  margin-bottom: 0;
  display: flex;
  flex-direction: column;
}
.grid-item .el-form-item__content {
  flex: 1;
  min-width: 0; /* 确保输入框可收缩适配列宽 */
}

/* 全宽项目 */
.full-width-item {
  width: 100%;
  margin-bottom: 15px;
}

/* 诊断区域布局 */
.diagnosis-container {
  display: grid;
  grid-template-columns: 1fr 1fr;
  gap: 20px;
  margin-bottom: 15px;
}

.diagnosis-item {
  margin-bottom: 0;
}

/* 带单位输入框 */
.input-with-unit {
  display: flex;
  align-items: center;
  gap: 8px;
}

.unit {
  white-space: nowrap;
  color: #666;
}

/* 签名区域优化 */
.signature-area {
  grid-template-columns: repeat(auto-fit, minmax(240px, 1fr));
}

.signature-tip {
  font-size: 12px;
  color: #EF4444;
  margin-top: 4px;
}

/* 按钮组 */
.btn-group {
  display: flex;
  justify-content: center;
  gap: 15px;
  margin-top: 30px;
  padding-top: 20px;
  border-top: 2px solid #333;
}

/* 必填项样式 */
.required .el-form-item__label::before {
  content: '*';
  color: #ff4d4f;
  margin-right: 4px;
}

/* 响应式调整 */
@media (max-width: 768px) {
  .medical-document {
    padding: 15px;
  }

  .diagnosis-container {
    grid-template-columns: 1fr;
  }

  .adaptive-grid {
    grid-template-columns: 1fr;
  }

  .doc-title {
    font-size: 18px;
  }

  .section-title {
    font-size: 16px;
  }
}

/* 打印样式优化 */
@media print {
  .btn-group {
    display: none;
  }
  .medical-document {
    box-shadow: none;
    margin: 0;
    padding: 0;
  }

  .el-input__inner,
  .el-select__input,
  .el-textarea__inner {
    border: none !important;
    box-shadow: none !important;
    background: transparent !important;
  }
  .el-form-item__label {
    font-weight: bold !important;
  }
}
</style>
